From 554fd8c5195424bdbcabf5de30fdc183aba391bd Mon Sep 17 00:00:00 2001
From: upstream source tree <ports@midipix.org>
Date: Sun, 15 Mar 2015 20:14:05 -0400
Subject: obtained gcc-4.6.4.tar.bz2 from upstream website; verified
 gcc-4.6.4.tar.bz2.sig; imported gcc-4.6.4 source tree from verified upstream
 tarball.

downloading a git-generated archive based on the 'upstream' tag
should provide you with a source tree that is binary identical
to the one extracted from the above tarball.

if you have obtained the source via the command 'git clone',
however, do note that line-endings of files in your working
directory might differ from line-endings of the respective
files in the upstream repository.
---
 gcc/diagnostic.def | 45 +++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 45 insertions(+)
 create mode 100644 gcc/diagnostic.def

(limited to 'gcc/diagnostic.def')

diff --git a/gcc/diagnostic.def b/gcc/diagnostic.def
new file mode 100644
index 000000000..e13bd3ce0
--- /dev/null
+++ b/gcc/diagnostic.def
@@ -0,0 +1,45 @@
+/* Copyright (C) 2001, 2002, 2003, 2006, 2008 Free Software Foundation, Inc.
+
+This file is part of GCC.
+
+GCC is free software; you can redistribute it and/or modify it under
+the terms of the GNU General Public License as published by the Free
+Software Foundation; either version 3, or (at your option) any later
+version.
+
+GCC is distributed in the hope that it will be useful, but WITHOUT ANY
+WARRANTY; without even the implied warranty of MERCHANTABILITY or
+FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
+for more details.
+
+You should have received a copy of the GNU General Public License
+along with GCC; see the file COPYING3.  If not see
+<http://www.gnu.org/licenses/>.  */
+
+/* DK_UNSPECIFIED must be first so it has a value of zero.  We never
+   assign this kind to an actual diagnostic, we only use this in
+   variables that can hold a kind, to mean they have yet to have a
+   kind specified.  I.e. they're uninitialized.  Within the diagnostic
+   machinery, this kind also means "don't change the existing kind",
+   meaning "no change is specified".  */
+DEFINE_DIAGNOSTIC_KIND (DK_UNSPECIFIED, "")
+
+/* If a diagnostic is set to DK_IGNORED, it won't get reported at all.
+   This is used by the diagnostic machinery when it wants to disable a
+   diagnostic without disabling the option which causes it.  */
+DEFINE_DIAGNOSTIC_KIND (DK_IGNORED, "")
+
+/* The remainder are real diagnostic types.  */
+DEFINE_DIAGNOSTIC_KIND (DK_FATAL, "fatal error: ")
+DEFINE_DIAGNOSTIC_KIND (DK_ICE, "internal compiler error: ")
+DEFINE_DIAGNOSTIC_KIND (DK_ERROR, "error: ")
+DEFINE_DIAGNOSTIC_KIND (DK_SORRY, "sorry, unimplemented: ")
+DEFINE_DIAGNOSTIC_KIND (DK_WARNING, "warning: ")
+DEFINE_DIAGNOSTIC_KIND (DK_ANACHRONISM, "anachronism: ")
+DEFINE_DIAGNOSTIC_KIND (DK_NOTE, "note: ")
+DEFINE_DIAGNOSTIC_KIND (DK_DEBUG, "debug: ")
+/* These two would be re-classified as DK_WARNING or DK_ERROR, so the
+prefix does not matter.  */
+DEFINE_DIAGNOSTIC_KIND (DK_PEDWARN, "pedwarn: ")
+DEFINE_DIAGNOSTIC_KIND (DK_PERMERROR, "permerror: ")
+
-- 
cgit v1.2.3

